5 10 15 20 25 30

1

100

5 10 15 20 25 30 0.1

1

10

5 10 15 20 25 30 0.1

1

10

100

5 10 15 20 25 30

0.1

1

96Zr(d,p)^{97}Zr

BF: (n,γ) DR PE+CN

(b)

σ (mb) natZr(d,p)^{97}Zr (a)

TENDL-2021 BF+DR+PE+CN

EXFOR

96Zr(d,n)^{97}Nb

BF: (p,γ) DR: (d,n) PE+CN

(d)

E (MeV) natZr(d,n)^{97}Nb

TENDL-2021 BF+DR+PE+CN

(c) EXFOR