0.0

0.2

0.4

0.6

10 20 30 40 50 60 0.0

0.2

0.4

0.6

R

(d,

)

(d,p)

BU DI

(b)

(d,n)

DR=(d,p)+(d,n)+(d,

)

1

10

100

1000

p BU

p BF

(mb)

R

(a)

BU EB d + ^{52}Cr

PE+CN DI=BU+DR

BU DR (c)

10 20 30 40 50 60

R

(e)

DI BU (d,p)

(d,n) (d,

)

(d,t)

DR=(d,p)+(d,n)+(d,

)+(d,t)

10 20 30 40 50 1

10

100

1000

E (MeV)

p BU

p BF

R

(d)

EB

/_R

d + ^{94}Mo

PE+CN

DI=BU+DR

(f) DR

BU