10 20 30 40 50 10 20 30 40 50 10 20 30 40 50 10 20 30 40 50

10 20 30 40 50 0.0 0.2 0.4 0.6 PE+CN

DI=BU+DR

d + ^{56}Fe

E (MeV)

PE+CN

d + ^{58}Ni

DI=BU+DR

d+ ^{93}Nb

PE+CN

DI=BU+DR

d + ^{96}Zr

PE+CN

DI=BU+DR

σ_i/σ_R

PE+CN

DI=BU+DR

d + ^{55}Mn