10 20 30 40 50 1

10

100

1000

10 20 30 40 50

10

100

10 20 30 40 50 10

100

10 20 30 40 50 1

10

100

10 20 30 40 50

100

10 20 30 40 50 10

100

10 20 30 40 50 1

10

100 60Ni(d,2n2p)^{58}Co

DR: (d,α ) PE+CN

(c)

BF: (p,x)+(n,x)

natNi(d,xn2p)^{58}Co

BF+DR+PE+CN

60Ni

61Ni

62Ni

58Ni

TENDL-2021 (a) 61Ni(d,3n2p)^{58}Co

BF:(p,α)+(n,x)

PE+CN

TENDL-2021

BF+DR+PE+CN (d) 58Ni(d,2p)^{58}Co

EXFOR

BF: (n,p) PE+CN BF+PE+CN

(b)

10 20 30 40 50 1

10

100

E (MeV)

60Ni(d,n)^{61}Cu_{EXFOR}

DR: (d,n) PE+CN

BF: (p,γ)

TENDL-2021 (f)

σ (mb) natNi(d,xn)^{61}Cu

BF+DR+PE+CN

60Ni

62Ni

61Ni

(e) 61Ni(d,2n)^{61}Cu

TENDL-2021 PE+CN BF+PE+CN

BF: (p,n)

(g) 62Ni(d,3n)^{61}Cu

BF: (p,2n)

(h)