10^{−4}

10^{−3}

10^{−2}

10^{−1} dσ/dp^H_T [pb/GeV] p^{j1}_T > 20 GeV

K_{fac} = 1.32

0 0.5 1 1.5

0 50 100 150 200 250 300 350 400 p^H_T [GeV]

#/HqT

LHE Hj μ = m_H LHE Hj μ = p^{UB}_T K_{fac}× LHE H

HqT