| [GeV] μ| 100 150 200 250 300 350

[GeV] 2M

100

150

200

250

300

350

(90 GeV) 1 ±χ∼

(150 GeV) 1 ±χ∼

(210 GeV) 1 ±χ∼

(70 GeV) 1 0χ∼

(90 GeV) 1 0 χ∼

(95 GeV) 1 0χ∼

= 7 TeV s, ^{-1}

L dt = 2.06 fb

∫_{= 6β}

=100 GeV, tan 1M

=7 TeV s , ^{-1}

= 1 fb intL

ATLAS

S 95% CL ≥ Observed S Expected 95% CL σ1± Expected

(103.5 GeV) ± 1χ∼ LEP2