Neutron Log10 Energy Spectrum in Active Layer 4 in MeV 0

200

400

600

800

1000

0 1 2 3 4 5

Neutron Log10 Energy Spectrum in Active Layer 4 in MeV 0 5 10 15 20 25 30 35 40 45

0 1 2 3 4 5

Proton Log10 Energy Spectrum in Active Layer 4 in MeV 0

20

40

60

80

100

120

-4 -3 -2 -1 0 1 2 3 4 5

Pion Log10 Energy Spectrum in Active Layer 4 in MeV 0 50 100 150 200 250 300 350 400

-4 -3 -2 -1 0 1 2 3 4 5