%\listfiles
%\documentclass[12pt,aps,prb,superscriptaddress,twocolumn,showpacs]{revtex4-1}
\documentclass[a4paper,12pt]{revtex4}
\usepackage[T1]{fontenc}
\usepackage[utf8]{inputenc}
\usepackage[english]{babel}
\usepackage{blindtext}
 
\setlength{\textheight}{9.7in}

\renewcommand{\andname}{\ignorespaces}
 
\begin{document}
%
{\noindent \small \it The 3$^{rd}$ International Conference on Science, Application, and 
\\Technology of Xenon Radiation Detectors (XeSAT)
\\April 3$^{rd}$ - 7$^{th}$, 2017
at Pullman Raja Orchid Hotel, Khon Kaen, Thailand}
%
\vspace{0.5in}

\title{Title}


\author{\underline{Corresponding Author}$^{1,2,*}$, Second Author$^{2}$, Third Author$^{3}$ and Fourth Author$^{1,2}$}
\affiliation{$^{1}$School of Physics, Institute of Science, Suranaree University of Technology, Nakhon Ratchasima 30000, Thailand}
\affiliation{$^{2}$Synchrotron Light Research Institute (Public Organization), 111 University Avenue, Muang District, Nakhon Ratchasima 30000, Thailand}
\affiliation{$^{3}$National Astronomical Research Institute of Thailand, Chiangmai 50200, Thailand\\
$^{*}$E-mail address: xxxx@xxxxx}

\begin{abstract}
   \blindtext
\end{abstract}
 
   \maketitle
\end{document}