Thresholds in Gy/sec

-210^{-1}10 1

Maximum Noise in Gy/sec

-410

-310

-210

-110

1

10 5.0 TeV 3.5 TeV 450 GeV

Entries 3589 sec μ Maximum Noise and Thresholds (RS01) 40