Entries 289 Mean 20.42 ± 492.8 RMS 14.44 ± 347.1 Underflow 0 Overflow 0

Maximum Noise [Gy/sec]

0 500 1000 1500 2000 2500 3000

Entreis

0

2

4

6

8

10

12_{Entries 289} ± ±

Mean Values in BITS

sec) μ SEM Maximum Noise (RS01 40